
Information on HP86 Kermit files

HP86 Kermit was designed for, and tested on, a Hewlett Packard 86 with
Hewlett Packard HP 82939A serial interface and I/O ROM, however it  is
very   likely   that   it   will   operate  successfully  on  an  HP87
microcomputer.

  General info:

HP8KER  MSG     The announcement of HP86 Kermit version 1.01.
HP8AAA  HLP     This file
HP8INS  DOC     How to install HP86 Kermit.
HP8KER  DOC     HP86 Kermit User Guide

  BASIC files:

HP8KER  BOO     Complete program suitable for bootstrap
HP8KRC  BAS     Complete program with comments for reference only

  Bootstrapping programs :

HP8BOO  FOR     Send .BOO file to HP86 (mainframe end of bootstrap).
HP8BOO  BAS     Receive .BOO file at HP86 (HP86 end of bootstrap).
