The file C644TH.SCR is an ASCII, printable file made from the FORTH screens
of C64-KERMIT, v1.5 , with carriage returns added to its 40-character
lines for printing, and with a few inter-screen heading lines added for
identification.  These screens were written for the original (version A)
Performance Micro Products C64-FORTH.  They will need modification for use
with other versions of FORTH, and some screens will be irrelevant to other
systems, especially those dealing with I/O.  This file is meant to be used
by knowledgeable FORTH programmers who wish to adapt and improve this
KERMIT program for their own private systems.                   
     R. Detenbeck, Physics Dept., University of VT, Burlington, VT 05405
